NAME RECLAB
DESCRIPTION 'HandWriting Recognizer Laboratory (American) PhatWare Corp. 1997'
EXETYPE WINDOWS
CODE PRELOAD MOVEABLE DISCARDABLE
DATA PRELOAD MOVEABLE MULTIPLE
HEAPSIZE 70000
STACKSIZE 70000
EXPORTS
        MainWndProc             @1
        mdiTapWndProc           @2
        mdiInkTextWndProc       @3
        txtTextWndProc          @4
        inkInkWndProc           @5
        dboEnumOutputProc       @6
        tlsToolWndProc          @7
        tlsEditProc             @8
        msgMatrixDlgBox         @9
        flmOpenTapHook          @10
        prfViewPrefDlgBox       @11 
        tapEnumOutputProc       @12
        xedDialogProc           @13
        xedXrKeyboard           @14
        xedXrEditString         @15
        xedXrColorHeight        @16
        xedXrAttributes         @17
        xedXrPenalty            @18
        ircDialogProc           @19
        EnumWndRecName          @20      
        VocDlgProc              @21
        lrnWndProc              @22
        alertWndProc            @23
        ctlShowCharSetWndProc   @24
        ctlShowTapWordWndProc   @25
        ctlShowStatusWndProc    @26
        pseEditPSIniDlgBox      @27
        pseEditProc             @28
        msgLayoutDlgBox         @29
        txtFindWordDlgBox       @30
      ; infWndProc              @31
        hlvDlgBox               @32
        batGetBatchNamesHook    @33
        batShowWndProc          @34
        hlvTrajProc             @37
        hlvAnswersProc          @38
        hlvAnswersDlgBox        @39
        hlvCorToolsProc         @40
      ; srlSettingsDlgProc      @41
        ddeServerWndProc        @42
        hlvCorResult            @43
        hlvInputResult          @44
        msgLowDbgCross_GDlgBox  @45
